à                                   Choose the logged MoTeC data file toexamine.   Both 3D  and 8M log filesare supported.                      àMIXTURE MAP                        Graphs  the  Lambda readings  loggedduring  a session  against  throttleposition.                                                               Each throttle position can be turnedon or off by pushing the appropriateFunction Key (e.g. F4 for 40%)  thenpressing Enter.                                                         On 8M log files  Alt-F4 will  switchbetween displaying  Lambda one & twoindividually and combined.          àGENERAL                            No help for this section.           àRPM MAP                            Provides an analysis of engine usageduring a logged session.                                                Useful in  determining the  area  ofgreatest  usage and therefore  wherethe  development effort should be   targetted.                          àGRAPH                              This facility allows for graphing oflogged data.                                                            F1 - Set start & end points (secs)  F2 - Zoom graph about current cursorF3 - Print Graph as displayed       F4 - Selects  current  position   as     start point  for speed  overlay     graph.                         F5 - Select parameters to graph     F6 - Trim Graph before  or after the     current cursor position.       